\begin{frame}{Geschichtliche Einordnung - Henry Ford}{Bürger-, Weltkriege und die 2. industrielle Revolution}
   \begin{tikzpicture}
      \useasboundingbox (0,0) rectangle(\textwidth,0.8\textheight);
      \node [below right] at (current bounding box.north west){
         \begin{minipage}[t]{.5\linewidth}
            Henry Ford lebte von 1863 bis 1947
            \begin{itemize}
               \item Ende des Amerikanischen Bürgerkrieges (1865)
               \item Beginn der 2. Industriellen Revolution (Beginn der 1870er)
               \item 1. Weltkrieg (1914-1918)
               \item Spanische Grippe (1918-1920)
               \item 2. Weltkrieg (1933-1945)
            \end{itemize}
         \end{minipage} 
      };

      \node [below left = 5mm and -7mm] (zip2) at (current bounding box.north east){
         \includegraphics[width=.5\textwidth]{2nd-industrial-revolution.jpg}
      };
      \node[above right] at (current bounding box.south west) {
         \begin{minipage}[t]{\linewidth}
            \tiny
            \textbf{Quellen:}\\
            https://pngeans.com/wp-content/uploads/2019/12/Hartmann\_Maschinenhalle\_1868\_01-1-1024x665.jpg
         \end{minipage}
      };
   \end{tikzpicture}
\end{frame}